-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 960 Mean = 0.2687 RMS = 0.3524 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 960 Mean = 0.09886 RMS = 0.3098 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 960 Mean = -0.007421 RMS = 0.2647 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 720 Mean = 0.2359 RMS = 0.3736 Under = 0 Over = 0 Integ = 720

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 960 Mean = -0.3019 RMS = 0.3297 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 960 Mean = -0.1347 RMS = 0.3525 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 960 Mean = 0.4815 RMS = 2.464 Under = 0 Over = 36 Integ = 924

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 960 Mean = -0.4383 RMS = 0.3148 Under = 0 Over = 0 Integ = 960