-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

1

10

10^2

10^3

Fractional Gain Difference for Sta-1 Oct-0_{dgainHist_s1o0}

Nent = 960 Mean = -0.0004555 RMS = 0.02186 Under = 0 Over = 0 Integ = 960

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

1

10

10^2

10^3

Fractional Gain Difference for Sta-1 Oct-1_{dgainHist_s1o1}

Nent = 960 Mean = 0.00025 RMS = 0.01628 Under = 0 Over = 0 Integ = 960

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

1

10

10^2

10^3

Fractional Gain Difference for Sta-1 Oct-2_{dgainHist_s1o2}

Nent = 960 Mean = 0.0006658 RMS = 0.004711 Under = 0 Over = 0 Integ = 960

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

1

10

10^2

Fractional Gain Difference for Sta-1 Oct-3_{dgainHist_s1o3}

Nent = 720 Mean = -0.0008269 RMS = 0.001615 Under = 0 Over = 0 Integ = 720

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

1

10

10^2

10^3

Fractional Gain Difference for Sta-1 Oct-4_{dgainHist_s1o4}

Nent = 960 Mean = 0.0003965 RMS = 0.03249 Under = 0 Over = 5 Integ = 955

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

1

10

10^2

10^3

Fractional Gain Difference for Sta-1 Oct-5_{dgainHist_s1o5}

Nent = 960 Mean = 0.001781 RMS = 0.002529 Under = 0 Over = 0 Integ = 960

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

1

10

10^2

Fractional Gain Difference for Sta-1 Oct-6_{dgainHist_s1o6}

Nent = 960 Mean = -0.0007842 RMS = 0.02555 Under = 0 Over = 0 Integ = 960

-1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

1

10

10^2

10^3

Fractional Gain Difference for Sta-1 Oct-7_{dgainHist_s1o7}

Nent = 960 Mean = 0.0001958 RMS = 0.002043 Under = 0 Over = 0 Integ = 960