0 50 100 150 200 250 300

-0.01

-0.008

-0.006

-0.004

-0.002 0 0.002

0.004

0.006

0.008

StripPar1_0 Nent = 0 Mean = 141.5 RMS = 65.05

Slope vrs Strip - Sta2 Oct4 Pla0 _{StripPar1_0}

0 50 100 150 200 250 300

-0.006

-0.004

-0.002 0 0.002

0.004

0.006

0.008

StripPar1_1 Nent = 0 Mean = 143 RMS = 68.76

Slope vrs Strip - Sta2 Oct4 Pla1

0 50 100 150 200 250 300

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002 0 0.002

0.004

0.006

0.008

StripPar1_2 Nent = 0 Mean = 158.6 RMS = 78.74

Slope vrs Strip - Sta2 Oct4 Pla2 _{StripPar1_2}

0 50 100 150 200 250 300

-0.02

-0.015

-0.01

-0.005 0 0.005

0.01

0.015

0.02

StripPar1_3 Nent = 0 Mean = 130.6 RMS = 86.14

Slope vrs Strip - Sta2 Oct4 Pla3 _{StripPar1_3}