0 50 100 150 200 250 300

-0.04

-0.03

-0.02

-0.01

0

StripPar1_0 Nent = 0 Mean = 150.2 RMS = 62.98

Slope vrs Strip - Sta2 Oct3 Pla0 _{StripPar1_0}

0 50 100 150 200 250 300

-0.08

-0.07

-0.06

-0.05

-0.04

-0.03

-0.02

-0.01 0 0.01

StripPar1_1 Nent = 0 Mean = 154.8 RMS = 55.33

Slope vrs Strip - Sta2 Oct3 Pla1 _{StripPar1_1}

0 50 100 150 200 250 300

-0.015

-0.01

-0.005

0

0.005

0.01

0.015

StripPar1_2 Nent = 0 Mean = 126 RMS = 75.85

Slope vrs Strip - Sta2 Oct3 Pla2

0 50 100 150 200 250 300

-0.015

-0.01

-0.005

-0

0.005

0.01

StripPar1_3 Nent = 0 Mean = 110.1 RMS = 69.01

Slope vrs Strip - Sta2 Oct3 Pla3 _{StripPar1_3}