0 50 100 150 200 250 300

-0.01

-0.005 0 0.005

0.01

0.015

0.02

StripPar1_0 Nent = 0 Mean = 132 RMS = 73.63

Slope vrs Strip - Sta2 Oct0 Pla0

0 50 100 150 200 250 300

-0.01

-0.005 0 0.005

0.01

0.015

0.02

StripPar1_1 Nent = 0 Mean = 125.1 RMS = 68.5

Slope vrs Strip - Sta2 Oct0 Pla1 _{StripPar1_1}

0 50 100 150 200 250 300

-0.015

-0.01

-0.005 -0 0.005

0.01

0.015

0.02

0.025

StripPar1_2 Nent = 0 Mean = 128.2 RMS = 79.49

Slope vrs Strip - Sta2 Oct0 Pla2 _{StripPar1_2}

0 50 100 150 200 250 300

-0.01

-0.005 0 0.005

0.01

0.015

0.02

0.025

StripPar1_3 Nent = 0 Mean = 133.7 RMS = 73.34

Slope vrs Strip - Sta2 Oct0 Pla3 _{StripPar1_3}