0 20 40 60 80 100 120 140 160 180

-0.01

-0.005

0

0.005

0.01

StripPar1_0 Nent = 0 Mean = 70.27 RMS = 48.25

Slope vrs Strip - Sta1 Oct2 Pla0 StripPar1_0

0 20 40 60 80 100 120 140 160 180

-0.01

-0.008

-0.006

-0.004

-0.002 0 0.002

0.004

0.006

0.008

StripPar1_1 Nent = 0 Mean = 74.12 RMS = 44.2

Slope vrs Strip - Sta1 Oct2 Pla1 StripPar1_1

0 20 40 60 80 100 120 140 160 180

-0.008

-0.006

-0.004

-0.002 0 0.002

0.004

0.006

0.008

0.01

StripPar1_2 Nent = 0 Mean = 92.33 RMS = 44.17

Slope vrs Strip - Sta1 Oct2 Pla2 StripPar1_2

0 20 40 60 80 100 120 140 160 180

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002 0 0.002

0.004

0.006

StripPar1_3 Nent = 0 Mean = 66.94 RMS = 45.47

Slope vrs Strip - Sta1 Oct2 Pla3 StripPar1_3

0 20 40 60 80 100 120 140 160 180

-0.01

-0.005

0

0.005

0.01

0.015

StripPar1_4 Nent = 0 Mean = 69.74 RMS = 43.22

Slope vrs Strip - Sta1 Oct2 Pla4 StripPar1_4

0 20 40 60 80 100 120 140 160 180

-0.006

-0.004

-0.002 0 0.002

0.004

0.006

StripPar1_5 Nent = 0 Mean = 66.24 RMS = 43.48

Slope vrs Strip - Sta1 Oct2 Pla5 StripPar1_5