0 20 40 60 80 100

-0.01

-0.005 0 0.005

0.01

0.015

StripPar1_0 Nent = 0 Mean = 70.18 RMS = 14.66

Slope vrs Strip - Sta0 Oct7 Pla0 StripPar1_0

0 20 40 60 80 100

-0.015

-0.01

-0.005 0 0.005

0.01

0.015

StripPar1_1 Nent = 0 Mean = 71.09 RMS = 18.61

Slope vrs Strip - Sta0 Oct7 Pla1 StripPar1_1

0 20 40 60 80 100

-0.015

-0.01

-0.005 0 0.005

0.01

0.015

0.02

StripPar1_2 Nent = 0 Mean = 62.31 RMS = 16.9

Slope vrs Strip - Sta0 Oct7 Pla2 StripPar1_2

0 20 40 60 80 100

-0.03

-0.02

-0.01 0 0.01

0.02

0.03

StripPar1_3 Nent = 0 Mean = 62.96 RMS = 19.92

Slope vrs Strip - Sta0 Oct7 Pla3 StripPar1_3

0 20 40 60 80 100

-0.04

-0.02

0

0.02

0.04

StripPar1_4 Nent = 0 Mean = 67.2 RMS = 19.32

Slope vrs Strip - Sta0 Oct7 Pla4 StripPar1_4

0 20 40 60 80 100

-0.04

-0.03

-0.02

-0.01 0 0.01

0.02

0.03

0.04

StripPar1_5 Nent = 0 Mean = 66.8 RMS = 17.86

Slope vrs Strip - Sta0 Oct7 Pla5 StripPar1_5