E866 Beam Dump

ffl SM0, SM12 focus muons into apparatus ffl Beam absorbed in 4.3 m Copper Dump 2 � 10^{12} protons/spill ffl 13.4 interaction length absorber for hadrons:

0.6 m Cu, 2.7 m C, 1.8 m CH_2