FNAL Meson East Spectrometer

ffl Forward xf , high-mass μ^+μ^� spectrometer ffl Liquid H2, D2 and Empty targets ffl Three magnets (SM0, SM12, SM3) ffl Thick hadron absorber-μ identification ffl Four tracking stations ffl Scale: 60m long, 3m � 3m at back