Extraction of d̄/ū

ffl Iteratively calculate (leading order) Drell-Yan

σ^{pd}/2σ^{pp}, find d̄/ū which makes the calculation agree with the measurement.

ffl Assumptions:

) CTEQ4M or MRS(R2) for uv, dv,^¯d + ū. ) Value^¯d/ū when x1 > 0.35. or ffl Include σ^{pd}/2σ^{pp} data in global fit (e.g. CTEQ5,

MRST, GRV98).