Silicon

Vertex

Spectrometer

SM12 Analyzing Magnet

Station 1

SM3Analyzing

Magnet

Ring-Imaging

Cherenkov

Counter

Station 2

Electromagnetic

Calorimeter

Hadronic

Muon Detectors

Station 3