FNAL Meson East Spectrometer

ffl Forward x_F , high-mass dimuon spectrometer ffl Solid Be, F e, W and MT targets ffl μ identification behind thick absorber wall ffl Two acceptance defining magnets (SM0, SM12) ffl Four tracking stations, and one momentum

analyzing magnet

ffl Scale: 60m long, 3m � 3m at back